’+3’+2’+1

’0’-1’-2’-3Mech.

halftang.

-70.00

-60.00

-50.00

-40.00

-30.00

-20.00

-10.00

0.0010.00

20.00

30.00

40.00

50.00

60.00

70.00

90¡Declination80¡

70¡60¡50¡40¡30¡20¡10¡0¡-10¡-20¡-30¡

3H2Heast1 Heast1 Hwest

2 H west3 Hwest

TransitMechanicalLimitsAbout halfof beamobstructed